-- 添加缓存仓标识
alter table  bin_info add column  cache_bin_flag int(1) DEFAULT 0 COMMENT "0：不是 1:是" ;
-- 添加充电模式控制
ALTER TABLE equip_info ADD auto_charge INT DEFAULT 0 COMMENT "0-手动;1-自动充电" ;
-- 添加换电类型
ALTER TABLE swap_order ADD swap_way INT DEFAULT 0 COMMENT "换电类型:;1自动换电;2手动换电" ;


SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for manual_operation_record
-- ----------------------------
DROP TABLE IF EXISTS `manual_operation_record`;
CREATE TABLE `manual_operation_record` (
                                           `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                           `swap_order_sn` varchar(255)  DEFAULT NULL COMMENT '订单编号',
                                           `reason` varchar(255) DEFAULT NULL COMMENT '失败原因',
                                           `created_by` varchar(32)  DEFAULT NULL COMMENT '创建人',
                                           `created_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                           `updated_by` varchar(32) DEFAULT NULL COMMENT '更新人',
                                           `updated_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '更新时间',
                                           `operator` varchar(255) DEFAULT NULL COMMENT '操作人员',
                                           `type` int DEFAULT NULL COMMENT '人工操作;1人工确认成功;2人工确认失败',
                                           PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;
-- 修改电价模型表，字段类型
ALTER TABLE elec_price_model_version_detail MODIFY COLUMN price DOUBLE;
