/*
Navicat MySQL Data Transfer

Source Server         : rszn-dev
Source Server Version : 80034
Source Host           : 192.168.2.2:3306
Source Database       : huanneng_dev

Target Server Type    : MYSQL
Target Server Version : 80034
File Encoding         : 65001

Date: 2024-06-07 14:58:49
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for emeter_energy
-- ----------------------------
DROP TABLE IF EXISTS `emeter_energy`;
CREATE TABLE `emeter_energy` (
                                 `id` varchar(255) NOT NULL,
                                 `code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '电表编码',
                                 `value` float(10,4) DEFAULT NULL COMMENT '电表当前读数',
  `upload_time` datetime DEFAULT NULL COMMENT '充电机上报时间',
  `upload_flag` int DEFAULT NULL COMMENT '0未上传1上传',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci ROW_FORMAT=DYNAMIC COMMENT='电表小时';

-- ----------------------------
-- Table structure for emeter_energy_change
-- ----------------------------
DROP TABLE IF EXISTS `emeter_energy_change`;
CREATE TABLE `emeter_energy_change` (
                                        `id` varchar(255) NOT NULL,
                                        `code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NOT NULL COMMENT '电表编码',
                                        `value` float(10,4) DEFAULT NULL COMMENT '电表当前读数',
  `upload_time` datetime DEFAULT NULL COMMENT '充电机上报时间',
  `upload_flag` int DEFAULT NULL COMMENT '0未上传1上传',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci ROW_FORMAT=DYNAMIC COMMENT='电表小时';
-- 添加换电类型
ALTER TABLE swap_order_report_cloud ADD `upload_time`  datetime DEFAULT NULL COMMENT "上报时间" ;

-- 添加入仓时间
ALTER TABLE bin_info ADD `in_time`  datetime DEFAULT NULL COMMENT "入仓时间" ;
