-- 添加缓存仓标识
alter table  bin_info add column  cache_bin_flag int(1) DEFAULT 0 COMMENT "0：不是 1:是" ;
-- 添加充电模式控制
ALTER TABLE equip_info ADD auto_charge INT DEFAULT 0 COMMENT "0-手动;1-自动充电" ;
-- 添加换电类型
ALTER TABLE swap_order ADD swap_way INT DEFAULT 0 COMMENT "换电类型:;1自动换电;2手动换电" ;


SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for manual_operation_record
-- ----------------------------
DROP TABLE IF EXISTS `manual_operation_record`;
CREATE TABLE `manual_operation_record` (
                                           `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                           `swap_order_sn` varchar(255)  DEFAULT NULL COMMENT '订单编号',
                                           `reason` varchar(255) DEFAULT NULL COMMENT '失败原因',
                                           `created_by` varchar(32)  DEFAULT NULL COMMENT '创建人',
                                           `created_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                           `updated_by` varchar(32) DEFAULT NULL COMMENT '更新人',
                                           `updated_time` datetime DEFAULT CURRENT_TIMESTAMP COMMENT '更新时间',
                                           `operator` varchar(255) DEFAULT NULL COMMENT '操作人员',
                                           `type` int DEFAULT NULL COMMENT '人工操作;1人工确认成功;2人工确认失败',
                                           PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci;
-- 修改电价模型表，字段类型
ALTER TABLE elec_price_model_version_detail MODIFY COLUMN price DOUBLE;
-- ----------------------------
-- Table structure for equip_alarm_record设备报警记录
-- ----------------------------
DROP TABLE IF EXISTS `equip_alarm_record`;
CREATE TABLE `equip_alarm_record`  (
                                       `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                       `equip_type_code` int NULL DEFAULT NULL COMMENT '设备类型编码',
                                       `equip_code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '设备编码',
                                       `error_code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '报警编码',
                                       `error_level` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '报警等级',
                                       `error_msg` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '报警描述',
                                       `process_method` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '处理方法',
                                       `created_by` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '创建人',
                                       `created_time` datetime NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                       `updated_by` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '更新人',
                                       `updated_time` datetime NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
                                       PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 2 CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci COMMENT = '设备报警记录' ROW_FORMAT = DYNAMIC;

SET FOREIGN_KEY_CHECKS = 1;

-- ----------------------------
-- Table structure for equip_alarm_process_record设备报警处理记录
-- ----------------------------
DROP TABLE IF EXISTS `equip_alarm_process_record`;
CREATE TABLE `equip_alarm_process_record`  (
                                               `id` int NOT NULL COMMENT 'id',
                                               `equip_type_code` int NULL DEFAULT NULL COMMENT '设备类型编码',
                                               `equip_code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '设备编码',
                                               `error_code` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '报警编码',
                                               `error_level` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '报警等级',
                                               `error_msg` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '报警描述',
                                               `process_method` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '处理方法',
                                               `process_time` datetime NULL DEFAULT NULL COMMENT '处理时间',
                                               `created_by` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '创建人',
                                               `created_time` datetime NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
                                               `updated_by` varchar(32) CHARACTER SET utf8mb4 COLLATE utf8mb4_0900_ai_ci NULL DEFAULT NULL COMMENT '更新人',
                                               `updated_time` datetime NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间'
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_0900_ai_ci COMMENT = '设备报警处理记录' ROW_FORMAT = DYNAMIC;

SET FOREIGN_KEY_CHECKS = 1;
-- 模型两个表id自增
ALTER TABLE battery_op_model MODIFY COLUMN id INT AUTO_INCREMENT;
ALTER TABLE battery_op_model_detail MODIFY COLUMN id INT AUTO_INCREMENT;
